Centro Astronómico Hispano Alemán / Max-Planck-Institut für Astronomie

TWIN-Spectrograph Observation Log

Observer: Weather: Date: Beamsplitter: Blue Channel: Grating: Detector: Red Channel: Grating: Detector:

Notes: Page: Of

Time File(s) Object RA DEC Eqnx. Airm. Grating-Angle Slit- P.A. Expos. Comments (UT) Blue / Red Width time